/**
 * Description Validation Test
 *
 * Tests for the 400-character description validation across App and Dataset
 * creation and editing workflows to ensure consistent validation behavior.
 */

describe('Description Validation Logic', () => {
  // Simulate backend validation function
  const validateDescriptionLength = (description?: string | null) => {
    if (description && description.length > 400)
      throw new Error('Description cannot exceed 400 characters.')

    return description
  }

  describe('Backend Validation Function', () => {
    it('allows description within 400 characters', () => {
      const validDescription = 'x'.repeat(400)
      expect(() => validateDescriptionLength(validDescription)).not.toThrow()
      expect(validateDescriptionLength(validDescription)).toBe(validDescription)
    })

    it('allows empty description', () => {
      expect(() => validateDescriptionLength('')).not.toThrow()
      expect(() => validateDescriptionLength(null)).not.toThrow()
      expect(() => validateDescriptionLength(undefined)).not.toThrow()
    })

    it('rejects description exceeding 400 characters', () => {
      const invalidDescription = 'x'.repeat(401)
      expect(() => validateDescriptionLength(invalidDescription)).toThrow(
        'Description cannot exceed 400 characters.',
      )
    })
  })

  describe('Backend Validation Consistency', () => {
    it('App and Dataset have consistent validation limits', () => {
      const maxLength = 400
      const validDescription = 'x'.repeat(maxLength)
      const invalidDescription = 'x'.repeat(maxLength + 1)

      // Both should accept exactly 400 characters
      expect(validDescription.length).toBe(400)
      expect(() => validateDescriptionLength(validDescription)).not.toThrow()

      // Both should reject 401 characters
      expect(invalidDescription.length).toBe(401)
      expect(() => validateDescriptionLength(invalidDescription)).toThrow()
    })

    it('validation error messages are consistent', () => {
      const expectedErrorMessage = 'Description cannot exceed 400 characters.'

      // This would be the error message from both App and Dataset backend validation
      expect(expectedErrorMessage).toBe('Description cannot exceed 400 characters.')

      const invalidDescription = 'x'.repeat(401)
      try {
        validateDescriptionLength(invalidDescription)
      } catch (error) {
        expect((error as Error).message).toBe(expectedErrorMessage)
      }
    })
  })

  describe('Character Length Edge Cases', () => {
    const testCases = [
      { length: 0, shouldPass: true, description: 'empty description' },
      { length: 1, shouldPass: true, description: '1 character' },
      { length: 399, shouldPass: true, description: '399 characters' },
      { length: 400, shouldPass: true, description: '400 characters (boundary)' },
      { length: 401, shouldPass: false, description: '401 characters (over limit)' },
      { length: 500, shouldPass: false, description: '500 characters' },
      { length: 1000, shouldPass: false, description: '1000 characters' },
    ]

    testCases.forEach(({ length, shouldPass, description }) => {
      it(`handles ${description} correctly`, () => {
        const testDescription = length > 0 ? 'x'.repeat(length) : ''
        expect(testDescription.length).toBe(length)

        if (shouldPass) {
          expect(() => validateDescriptionLength(testDescription)).not.toThrow()
          expect(validateDescriptionLength(testDescription)).toBe(testDescription)
        } else {
          expect(() => validateDescriptionLength(testDescription)).toThrow(
            'Description cannot exceed 400 characters.',
          )
        }
      })
    })
  })
})
